Scale JH481929:

Other RefSeq

RepeatMasker

2 kb turTru2 23,000 23,500 24,000 24,500 25,000 25,500 26,000 26,500 27,000 27,500 28,000 28,500 29,000 29,500 Human exons mapped by CESAR

GC Percent in 5-Base Windows

Genscan Gene Predictions

Non-Dolphin RefSeq Genes

Cow (Oct. 2011 (Baylor Btau_4.6.1/bosTau7)) Chained Alignments

Cow (Oct. 2011 (Baylor Btau_4.6.1/bosTau7)) Alignment Net

Repeating Elements by RepeatMasker

RHO

JH481929.3

chr22 + 57450k chr4 + 95482k chrX - 23799k chr19 + 60101k chrX - 23796k chrX - 23793k chr28 + 24935k

GC Percent

70 _

30 _