Scale scaffold_15:

Gap RefSeq All RefSeq Curated

Other RefSeq

RepeatMasker

200 bases cavPor3 19,047,500 19,047,550 19,047,600 19,047,650 19,047,700 19,047,750 19,047,800 19,047,850 19,047,900 19,047,950 19,048,000 Human exons mapped by CESAR Gap Locations RefSeq genes from NCBI

AUGUSTUS ab initio gene predictions v3.1 Human Proteins Mapped by Chained tBLASTn

N-SCAN Gene Predictions Non-Guinea pig RefSeq Genes Transfer RNA Genes Identified with tRNAscan-SE Repeating Elements by RepeatMasker

NEUROG3

g11166.t1 NEUROG3 NEUROG2 ATOH1 ATOH7 scaffold_15.103.1