Scale GL095587: Gap

Other RefSeq Spliced ESTs

RepeatMasker

5 kb macEug2 27,000 28,000 29,000 30,000 31,000 32,000 33,000 34,000 35,000 36,000 37,000 38,000 39,000 40,000 Gap Locations AUGUSTUS ab initio gene predictions v3.1

Non-Wallaby RefSeq Genes Wallaby ESTs That Have Been Spliced Wallaby mRNAs from GenBank Repeating Elements by RepeatMasker g10004.t1 g10004.t2