Scale chr2R:

Other RefSeq

Spliced ESTs RepeatMasker EVA SNP Release 6

1 kb anoGam3 6,480,000 6,480,500 6,481,000 6,481,500 6,482,000 AUGUSTUS ab initio gene predictions v3.1 Ensembl Gene Predictions - archive 37 - aug2017

Non-A. gambiae RefSeq Genes A. gambiae mRNAs from GenBank A. gambiae ESTs That Have Been Spliced Repeating Elements by RepeatMasker Short Genetic Variants from European Variant Archive g2836.t1 g2837.t1 AGAP001585-RC AGAP001585-RB AGAP001585-RD AGAP001585-RA

AF488801