Scale CYUI01014949v1: Gap RefSeq Genes

RepeatMasker

10 kb gorGor5 16,865,000 16,870,000 16,875,000 16,880,000 16,885,000 16,890,000 16,895,000 16,900,000 16,905,000 Gap Locations

RefSeq Genes

Non-Gorilla RefSeq Genes

Gorilla mRNAs from GenBank Repeating Elements by RepeatMasker

Homo MEG3/NR_046470 Homo MEG3/NR_003530 Homo MEG3/NR_046467 Homo MEG3/NR_033359 Homo MEG3/NR_046473 Homo MEG3/NR_046472 Homo MEG3/NR_033360 Homo MEG3/NR_046469 Homo MEG3/NR_046466 Homo MEG3/NR_046471 Homo MEG3/NR_046465 Homo MEG3/NR_033358 Homo MEG3/NR_046464 Homo MEG3/NR_002766 Pongo MEG3/NR_037686 Pongo MEG3/NR_037685 Homo MEG3/NR_003531 Sus MEG3/NR_021488 Mus Meg3/NR_027652

Bos MEG3/NR_037684

Macaca MIR770/NR_032689 Homo MIR770/NR_030528 Pan MIR770/NR_035991 Equus MIR770/NR_033045